0.5

0.5

0.5

0.50.5

0.5

0.5

0.5

0.5

0.5

0.5

0.5

0.5

0.5

1

1

1

1

1

1

1

1

1.5

1.5

1.5

1.52

0˚

0˚

60˚

60˚

120˚

120˚

180˚

180˚

240˚

240˚

300˚

300˚

360˚

360˚

-60˚ -60˚

-30˚ -30˚

0˚ 0˚

30˚ 30˚

60˚ 60˚

Standard Deviation of Tide Models -K1 Tide

AG95.1 - CSR 3.0 - DW 3.2.88 - FES95.1 - ORI - RSC - SR(950308) - TPX0.2 RMS=0.89 cm

Contour Interval is 0.5 cm

cm 0.0 0.5 1.0 1.5 2.0