0˚

0˚

30˚

30˚

60˚

60˚

90˚

90˚

120˚

120˚

150˚

150˚

180˚

180˚

210˚

210˚

240˚

240˚

270˚

270˚

300˚

300˚

330˚

330˚

360˚

360˚

-60˚ -60˚

-30˚ -30˚

0˚ 0˚

30˚ 30˚

60˚ 60˚

Variability by Difference of Ascending/Descending Xover Tide Solutions

M2 Tidal Component - RMS= 1.38 cm

Contour Interval is 1.0 cm

cm 0 1 2 3 4 5 6