0 20 40 60 80 100

0 0.02

0.04

0.06

-4 -3 -2 -1 0 1 2

DEGREE, n CYCLES/DAY log10(cm^2)

FES95.2.1 10-Oct-95

0 20 40 60 80 100

0 0.02

0.04

0.06

-4 -3 -2 -1 0 1 2

DEGREE, n CYCLES/DAY log10(cm^2)

FES95.2.1 10-Oct-95

10^{-3} 10^{-2} 10^{-1}

10^0

10^1

10^2

10^3

CPD cm^2

FES95.2.1 10-Oct-95